[#DEFAULT_SCRIPTCHECK_THREADS]
= DEFAULT&lowbar;SCRIPTCHECK&lowbar;THREADS
:mrdocs:

&hyphen;par default (number of script&hyphen;checking threads, 0 &equals; auto)

== Synopsis

Declared in `&lt;node&sol;chainstatemanager&lowbar;args&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr int DEFAULT&lowbar;SCRIPTCHECK&lowbar;THREADS = &lcub;0&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
