[#DEFAULT_MAX_PEER_CONNECTIONS]
= DEFAULT&lowbar;MAX&lowbar;PEER&lowbar;CONNECTIONS
:mrdocs:

The maximum number of peer connections to maintain&period;

== Synopsis

Declared in `&lt;net&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr unsigned int DEFAULT&lowbar;MAX&lowbar;PEER&lowbar;CONNECTIONS = &lcub;200&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
