[#DEFAULT_MAX_MEMPOOL_SIZE_MB]
= DEFAULT&lowbar;MAX&lowbar;MEMPOOL&lowbar;SIZE&lowbar;MB
:mrdocs:

Default for &hyphen;maxmempool, maximum megabytes of mempool memory usage

== Synopsis

Declared in `&lt;kernel&sol;mempool&lowbar;options&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr unsigned int DEFAULT&lowbar;MAX&lowbar;MEMPOOL&lowbar;SIZE&lowbar;MB = &lcub;300&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
