[#DEFAULT_HTTP_WORKQUEUE]
= DEFAULT&lowbar;HTTP&lowbar;WORKQUEUE
:mrdocs:

The default value for `&hyphen;rpcworkqueue`&period; This is the maximum depth of the work queue, we don&apos;t allocate this number of work queue items upfront&period;

== Synopsis

Declared in `&lt;httpserver&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr int DEFAULT&lowbar;HTTP&lowbar;WORKQUEUE = 64;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
