[#DEFAULT_HTTP_THREADS]
= DEFAULT&lowbar;HTTP&lowbar;THREADS
:mrdocs:

The default value for `&hyphen;rpcthreads`&period; This number of threads will be created at startup&period;

== Synopsis

Declared in `&lt;httpserver&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr int DEFAULT&lowbar;HTTP&lowbar;THREADS = 16;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
