[#DEFAULT_HTTP_SERVER_TIMEOUT]
= DEFAULT&lowbar;HTTP&lowbar;SERVER&lowbar;TIMEOUT
:mrdocs:

The default value for `&hyphen;rpcservertimeout`, in seconds, before an idle client is disconnected&period;

== Synopsis

Declared in `&lt;httpserver&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr int DEFAULT&lowbar;HTTP&lowbar;SERVER&lowbar;TIMEOUT = 30;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
