[#DEFAULT_FULL_RELAY_INBOUND_PCT]
= DEFAULT&lowbar;FULL&lowbar;RELAY&lowbar;INBOUND&lowbar;PCT
:mrdocs:

Default percentage of inbound connection slots that tx&hyphen;relaying peers can use

== Synopsis

Declared in `&lt;net&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr int DEFAULT&lowbar;FULL&lowbar;RELAY&lowbar;INBOUND&lowbar;PCT = &lcub;50&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
