[#DEFAULT_COINBASE_OUTPUT_MAX_ADDITIONAL_SIGOPS]
= DEFAULT&lowbar;COINBASE&lowbar;OUTPUT&lowbar;MAX&lowbar;ADDITIONAL&lowbar;SIGOPS
:mrdocs:

Default sigops cost to reserve for coinbase transaction outputs when creating block templates&period;

== Synopsis

Declared in `&lt;policy&sol;policy&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr unsigned int DEFAULT&lowbar;COINBASE&lowbar;OUTPUT&lowbar;MAX&lowbar;ADDITIONAL&lowbar;SIGOPS = &lcub;400&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
