[#DEFAULT_CLUSTER_SIZE_LIMIT_KVB]
= DEFAULT&lowbar;CLUSTER&lowbar;SIZE&lowbar;LIMIT&lowbar;KVB
:mrdocs:

Maximum size of cluster in virtual kilobytes

== Synopsis

Declared in `&lt;policy&sol;policy&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr unsigned int DEFAULT&lowbar;CLUSTER&lowbar;SIZE&lowbar;LIMIT&lowbar;KVB = &lcub;101&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
