[#DEFAULT_BYTES_PER_SIGOP]
= DEFAULT&lowbar;BYTES&lowbar;PER&lowbar;SIGOP
:mrdocs:

Default for &hyphen;bytespersigop

== Synopsis

Declared in `&lt;policy&sol;policy&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr unsigned int DEFAULT&lowbar;BYTES&lowbar;PER&lowbar;SIGOP = &lcub;20&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
