[#DEFAULT_ANCESTOR_LIMIT]
= DEFAULT&lowbar;ANCESTOR&lowbar;LIMIT
:mrdocs:

Default for &hyphen;limitancestorcount, max number of in&hyphen;mempool ancestors

== Synopsis

Declared in `&lt;policy&sol;policy&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr unsigned int DEFAULT&lowbar;ANCESTOR&lowbar;LIMIT = &lcub;25&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
