[#DBParams-max_file_size]
= xref:DBParams.adoc[DBParams]::max&lowbar;file&lowbar;size
:relfileprefix: ../
:mrdocs:

Maximum LevelDB SST file size&period; Larger values reduce the frequency of compactions but increase their duration&period;

== Synopsis

Declared in `&lt;dbwrapper&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
size&lowbar;t max&lowbar;file&lowbar;size = DBWRAPPER&lowbar;MAX&lowbar;FILE&lowbar;SIZE;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
