[#CustomUintFormatter-MAX]
= xref:CustomUintFormatter.adoc[CustomUintFormatter]::MAX
:relfileprefix: ../
:mrdocs:

The largest value representable in the configured number of bytes&period;

== Synopsis

Declared in `&lt;serialize&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr static
uint64&lowbar;t MAX = 0xffffffffffffffff &gt;&gt; (8 &ast; (8 &hyphen; Bytes));
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
