[#ChainstateManager-m_interrupt]
= xref:ChainstateManager.adoc[ChainstateManager]::m&lowbar;interrupt
:relfileprefix: ../
:mrdocs:

Signal used to observe shutdown requests during long&hyphen;running operations&period;

== Synopsis

Declared in `&lt;validation&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:util/SignalInterrupt.adoc[util::SignalInterrupt] const& m&lowbar;interrupt;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
