[#Chainstate-m_next_write]
= xref:Chainstate.adoc[Chainstate]::m&lowbar;next&lowbar;write
:relfileprefix: ../
:mrdocs:

Earliest time at which the next periodic chainstate flush should occur&period;

== Synopsis

Declared in `&lt;validation&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:NodeClock/time_point.adoc[NodeClock::time&lowbar;point] m&lowbar;next&lowbar;write = &lcub;NodeClock&colon;&colon;time&lowbar;point&colon;&colon;max()&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
