[#CZMQAbstractNotifier-Shutdown]
= xref:CZMQAbstractNotifier.adoc[CZMQAbstractNotifier]::Shutdown
:relfileprefix: ../
:mrdocs:

Shut down the notifier and close its socket&period;

== Synopsis

Declared in `&lt;zmq&sol;zmqabstractnotifier&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
virtual
void
Shutdown() = 0;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
