[#CZMQAbstractNotifier-DEFAULT_ZMQ_SNDHWM]
= xref:CZMQAbstractNotifier.adoc[CZMQAbstractNotifier]::DEFAULT&lowbar;ZMQ&lowbar;SNDHWM
:relfileprefix: ../
:mrdocs:

Default ZMQ send high&hyphen;water mark (maximum queued outbound messages)&period;

== Synopsis

Declared in `&lt;zmq&sol;zmqabstractnotifier&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr static
int DEFAULT&lowbar;ZMQ&lowbar;SNDHWM = &lcub;1000&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
