[#CTxMemPool-GetAndIncrementSequence]
= xref:CTxMemPool.adoc[CTxMemPool]::GetAndIncrementSequence
:relfileprefix: ../
:mrdocs:

Guards this internal counter for external reporting

== Synopsis

Declared in `&lt;txmempool&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;requires&lowbar;capability(0x7f95135d3668), requires&lowbar;capability(0x7f9501b12a48), requires&lowbar;capability(0x7f950ec78c38), requires&lowbar;capability(0x7f9525ea8988), requires&lowbar;capability(0x7f95150980c8), requires&lowbar;capability(0x7f950826c368), requires&lowbar;capability(0x7f94f856fa78), requires&lowbar;capability(0x7f9513c59c68)&rsqb;&rsqb;
uint64&lowbar;t
GetAndIncrementSequence() const;
----

== Return Value

The current sequence number before incrementing it&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
