[#CTxIn-SEQUENCE_LOCKTIME_DISABLE_FLAG]
= xref:CTxIn.adoc[CTxIn]::SEQUENCE&lowbar;LOCKTIME&lowbar;DISABLE&lowbar;FLAG
:relfileprefix: ../
:mrdocs:

If this flag is set, CTxIn&colon;&colon;nSequence is NOT interpreted as a relative lock&hyphen;time&period; It skips SequenceLocks() for any input that has it set (BIP 68)&period; It fails OP&lowbar;CHECKSEQUENCEVERIFY&sol;CheckSequence() for any input that has it set (BIP 112)&period;

== Synopsis

Declared in `&lt;primitives&sol;transaction&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr static
uint32&lowbar;t SEQUENCE&lowbar;LOCKTIME&lowbar;DISABLE&lowbar;FLAG = &lcub;1U &lt;&lt; 31&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
