[#CTxIn-SEQUENCE_FINAL]
= xref:CTxIn.adoc[CTxIn]::SEQUENCE&lowbar;FINAL
:relfileprefix: ../
:mrdocs:

Setting nSequence to this value for every input in a transaction disables nLockTime&sol;IsFinalTx()&period; It fails OP&lowbar;CHECKLOCKTIMEVERIFY&sol;CheckLockTime() for any input that has it set (BIP 65)&period; It has SEQUENCE&lowbar;LOCKTIME&lowbar;DISABLE&lowbar;FLAG set (BIP 68&sol;112)&period;

== Synopsis

Declared in `&lt;primitives&sol;transaction&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr static
uint32&lowbar;t SEQUENCE&lowbar;FINAL = &lcub;0xffffffff&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
