[#CTxIn-MAX_SEQUENCE_NONFINAL]
= xref:CTxIn.adoc[CTxIn]::MAX&lowbar;SEQUENCE&lowbar;NONFINAL
:relfileprefix: ../
:mrdocs:

This is the maximum sequence number that enables both nLockTime and OP&lowbar;CHECKLOCKTIMEVERIFY (BIP 65)&period; It has SEQUENCE&lowbar;LOCKTIME&lowbar;DISABLE&lowbar;FLAG set (BIP 68&sol;112)&period;

== Synopsis

Declared in `&lt;primitives&sol;transaction&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr static
uint32&lowbar;t MAX&lowbar;SEQUENCE&lowbar;NONFINAL = &lcub;SEQUENCE&lowbar;FINAL &hyphen; 1&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
