[#CThreadInterrupt-reset]
= xref:CThreadInterrupt.adoc[CThreadInterrupt]::reset
:relfileprefix: ../
:mrdocs:

Reset to an non&hyphen;interrupted state&period;

== Synopsis

Declared in `&lt;util&sol;threadinterrupt&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
virtual
void
reset();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
