[#CScriptNum-nDefaultMaxNumSize]
= xref:CScriptNum.adoc[CScriptNum]::nDefaultMaxNumSize
:relfileprefix: ../
:mrdocs:

Default maximum size, in bytes, of a script number encoding&period;

== Synopsis

Declared in `&lt;script&sol;script&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr static
size&lowbar;t nDefaultMaxNumSize = &lcub;4&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
