[#CScriptBase]
= CScriptBase
:mrdocs:

We use a prevector for the script to reduce the considerable memory overhead of vectors in cases where they normally contain a small number of small elements&period;

== Synopsis

Declared in `&lt;script&sol;script&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
using CScriptBase = xref:prevector-0c.adoc[prevector&lt;36, uint8&lowbar;t&gt;];
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
