[#CScript-HasValidOps]
= xref:CScript.adoc[CScript]::HasValidOps
:relfileprefix: ../
:mrdocs:

Returns whether the script contains only valid opcodes&period;

== Synopsis

Declared in `&lt;script&sol;script&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
HasValidOps() const;
----

== Return Value

true if all opcodes are valid&period; Check if the script contains valid OP&lowbar;CODES


[.small]#Created with https://www.mrdocs.com[MrDocs]#
