[#CPubKey-SIGNATURE_SIZE]
= xref:CPubKey.adoc[CPubKey]::SIGNATURE&lowbar;SIZE
:relfileprefix: ../
:mrdocs:

Maximum size in bytes of a DER&hyphen;encoded ECDSA signature&period;

== Synopsis

Declared in `&lt;pubkey&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr static
unsigned int SIGNATURE&lowbar;SIZE = 72;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
