[#CNodeOptions-recv_flood_size]
= xref:CNodeOptions.adoc[CNodeOptions]::recv&lowbar;flood&lowbar;size
:relfileprefix: ../
:mrdocs:

Receive buffer size at which the connection is paused, in bytes&period;

== Synopsis

Declared in `&lt;net&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
size&lowbar;t recv&lowbar;flood&lowbar;size = &lcub;DEFAULT&lowbar;MAXRECEIVEBUFFER &ast; 1000&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
