[#CNode-fDisconnect]
= xref:CNode.adoc[CNode]::fDisconnect
:relfileprefix: ../
:mrdocs:

Setting this to true causes the node to be disconnected the next time DisconnectNodes() runs&period;

== Synopsis

Declared in `&lt;net&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
std::atomic&lowbar;bool fDisconnect = &lcub;false&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
