[#CNode-CloseSocketDisconnect]
= xref:CNode.adoc[CNode]::CloseSocketDisconnect
:relfileprefix: ../
:mrdocs:

Close the socket and mark the connection as disconnected&period;

== Synopsis

Declared in `&lt;net&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;requires&lowbar;capability(0x7f950f15df78), requires&lowbar;capability(0x7f950f1ed288), requires&lowbar;capability(0x7f950aff0968), requires&lowbar;capability(0x7f9503033868), requires&lowbar;capability(0x7f95236c2318), requires&lowbar;capability(0x7f952527ba88), requires&lowbar;capability(0x7f950ec810d8), requires&lowbar;capability(0x7f950dc34908), requires&lowbar;capability(0x7f951df904a8), requires&lowbar;capability(0x7f9524e49f48), requires&lowbar;capability(0x7f950f7241e8)&rsqb;&rsqb;
void
CloseSocketDisconnect();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
