[#CDBBatch-ApproximateSize]
= xref:CDBBatch.adoc[CDBBatch]::ApproximateSize
:relfileprefix: ../
:mrdocs:

Returns an estimate of the batch&apos;s serialized size in bytes&period;

== Synopsis

Declared in `&lt;dbwrapper&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
size&lowbar;t
ApproximateSize() const;
----

== Return Value

The approximate serialized size of the batch, in bytes&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
