[#CConnman-PrivateBroadcast-m_sem_conn_max]
= xref:CConnman.adoc[CConnman]::xref:CConnman/PrivateBroadcast.adoc[PrivateBroadcast]::m&lowbar;sem&lowbar;conn&lowbar;max
:relfileprefix: ../../
:mrdocs:

Semaphore used to guard against opening too many connections&period; Opening private broadcast connections will be paused if this is equal to 0&period;

== Synopsis

Declared in `&lt;net&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
std::counting&lowbar;semaphore&lt;&gt; m&lowbar;sem&lowbar;conn&lowbar;max = &lcub;MAX&lowbar;PRIVATE&lowbar;BROADCAST&lowbar;CONNECTIONS&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
