[#CConnman-Options-nReceiveFloodSize]
= xref:CConnman.adoc[CConnman]::xref:CConnman/Options.adoc[Options]::nReceiveFloodSize
:relfileprefix: ../../
:mrdocs:

Receive buffer size at which a connection is paused, in bytes&period;

== Synopsis

Declared in `&lt;net&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
unsigned int nReceiveFloodSize = 0;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
