[#CConnman-Options-m_peer_connect_timeout]
= xref:CConnman.adoc[CConnman]::xref:CConnman/Options.adoc[Options]::m&lowbar;peer&lowbar;connect&lowbar;timeout
:relfileprefix: ../../
:mrdocs:

Timeout for establishing a peer connection, in seconds&period;

== Synopsis

Declared in `&lt;net&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int64&lowbar;t m&lowbar;peer&lowbar;connect&lowbar;timeout = DEFAULT&lowbar;PEER&lowbar;CONNECT&lowbar;TIMEOUT;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
