[#CConnman-Options-m_max_automatic_connections]
= xref:CConnman.adoc[CConnman]::xref:CConnman/Options.adoc[Options]::m&lowbar;max&lowbar;automatic&lowbar;connections
:relfileprefix: ../../
:mrdocs:

Maximum number of automatic connections (excludes manual, includes inbound)&period;

== Synopsis

Declared in `&lt;net&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int m&lowbar;max&lowbar;automatic&lowbar;connections = DEFAULT&lowbar;MAX&lowbar;PEER&lowbar;CONNECTIONS;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
