[#CClientUIInterface-MessageBoxFlags]
= xref:CClientUIInterface.adoc[CClientUIInterface]::MessageBoxFlags
:relfileprefix: ../
:mrdocs:

Flags for CClientUIInterface&colon;&colon;ThreadSafeMessageBox

== Synopsis

Declared in `&lt;node&sol;interface&lowbar;ui&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
enum MessageBoxFlags : uint32&lowbar;t;
----

== Members

[cols="1,4"]
|===
| Name| Description
| `ICON&lowbar;INFORMATION` 
| Informational message, no icon emphasis&period;
| `ICON&lowbar;WARNING` 
| Show a warning icon&period;
| `ICON&lowbar;ERROR` 
| Show an error icon&period;
| `ICON&lowbar;MASK` 
| Mask of all available icons in CClientUIInterface&colon;&colon;MessageBoxFlags This needs to be updated, when icons are changed there!
| `BTN&lowbar;OK` 
| These values are taken from qmessagebox&period;h &quot;enum StandardButton&quot; to be directly usable
| `BTN&lowbar;YES` 
| These values are taken from qmessagebox&period;h &quot;enum StandardButton&quot; to be directly usable
| `BTN&lowbar;NO` 
| These values are taken from qmessagebox&period;h &quot;enum StandardButton&quot; to be directly usable
| `BTN&lowbar;ABORT` 
| These values are taken from qmessagebox&period;h &quot;enum StandardButton&quot; to be directly usable
| `BTN&lowbar;RETRY` 
| These values are taken from qmessagebox&period;h &quot;enum StandardButton&quot; to be directly usable
| `BTN&lowbar;IGNORE` 
| These values are taken from qmessagebox&period;h &quot;enum StandardButton&quot; to be directly usable
| `BTN&lowbar;CLOSE` 
| These values are taken from qmessagebox&period;h &quot;enum StandardButton&quot; to be directly usable
| `BTN&lowbar;CANCEL` 
| These values are taken from qmessagebox&period;h &quot;enum StandardButton&quot; to be directly usable
| `BTN&lowbar;DISCARD` 
| These values are taken from qmessagebox&period;h &quot;enum StandardButton&quot; to be directly usable
| `BTN&lowbar;HELP` 
| These values are taken from qmessagebox&period;h &quot;enum StandardButton&quot; to be directly usable
| `BTN&lowbar;APPLY` 
| These values are taken from qmessagebox&period;h &quot;enum StandardButton&quot; to be directly usable
| `BTN&lowbar;RESET` 
| These values are taken from qmessagebox&period;h &quot;enum StandardButton&quot; to be directly usable
| `BTN&lowbar;MASK` 
| Mask of all available buttons in CClientUIInterface&colon;&colon;MessageBoxFlags This needs to be updated, when buttons are changed there!
| `MODAL` 
| Force blocking, modal message box dialog (not just OS notification)
| `SECURE` 
| Do not print contents of message to debug log
| `MSG&lowbar;INFORMATION` 
| Predefined combinations for certain default usage cases
| `MSG&lowbar;WARNING` 
| Predefined combinations for certain default usage cases
| `MSG&lowbar;ERROR` 
| Predefined combinations for certain default usage cases
|===



[.small]#Created with https://www.mrdocs.com[MrDocs]#
