[#CCheckQueue-m_control_mutex]
= xref:CCheckQueue.adoc[CCheckQueue]::m&lowbar;control&lowbar;mutex
:relfileprefix: ../
:mrdocs:

Mutex to ensure only one concurrent CCheckQueueControl

== Synopsis

Declared in `&lt;checkqueue&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:Mutex.adoc[Mutex] m&lowbar;control&lowbar;mutex;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
