[#CChainParams-TestNet-04]
= xref:CChainParams.adoc[CChainParams]::TestNet
:relfileprefix: ../
:mrdocs:

`TestNet` overloads

== Synopses

Declared in `&lt;kernel&sol;chainparams&period;h&gt;`

Creates the testnet3 chain parameters with default options&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
std::unique&lowbar;ptr&lt;CChainParams const&gt;
xref:CChainParams/TestNet-09f.adoc[TestNet]();
----

[.small]#xref:CChainParams/TestNet-09f.adoc[_» more&period;&period;&period;_]#

Creates the testnet3 chain parameters with the given options&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
std::unique&lowbar;ptr&lt;CChainParams const&gt;
xref:CChainParams/TestNet-098.adoc[TestNet](xref:CChainParams/TestNetOptions.adoc[TestNetOptions] const& options);
----

[.small]#xref:CChainParams/TestNet-098.adoc[_» more&period;&period;&period;_]#

== Return Value

Owning pointer to the testnet3 chain parameters&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *options*
| The testnet configuration to apply&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
