[#CChainParams-DefaultConsistencyChecks]
= xref:CChainParams.adoc[CChainParams]::DefaultConsistencyChecks
:relfileprefix: ../
:mrdocs:

Default value for the &hyphen;checkmempool and &hyphen;checkblockindex arguments&period;

== Synopsis

Declared in `&lt;kernel&sol;chainparams&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
DefaultConsistencyChecks() const;
----

== Return Value

`true` when consistency checks are enabled by default&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
