[#CChainParams-AssumedChainStateSize]
= xref:CChainParams.adoc[CChainParams]::AssumedChainStateSize
:relfileprefix: ../
:mrdocs:

Minimum free space (in GB) needed for the data directory when pruned&semi; does not include the prune target&period;

== Synopsis

Declared in `&lt;kernel&sol;chainparams&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
uint64&lowbar;t
AssumedChainStateSize() const;
----

== Return Value

The assumed pruned chain&hyphen;state size in gigabytes&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
