[#CBaseChainParams-RPCPort]
= xref:CBaseChainParams.adoc[CBaseChainParams]::RPCPort
:relfileprefix: ../
:mrdocs:

Returns the default RPC port for this chain&period;

== Synopsis

Declared in `&lt;chainparamsbase&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
uint16&lowbar;t
RPCPort() const;
----

== Return Value

The RPC port number&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
