[#BaseParams]
= BaseParams
:mrdocs:

Return the currently selected parameters&period; This won&apos;t change after app startup, except for unit tests&period;

== Synopsis

Declared in `&lt;chainparamsbase&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:CBaseChainParams.adoc[CBaseChainParams] const&
BaseParams();
----

== Return Value

The currently selected base chain parameters&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
