[#BCLog-RATELIMIT_MAX_BYTES]
= xref:BCLog.adoc[BCLog]::RATELIMIT&lowbar;MAX&lowbar;BYTES
:relfileprefix: ../
:mrdocs:

maximum number of bytes per source location that can be logged within the rate&hyphen;limit window

== Synopsis

Declared in `&lt;logging&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
constexpr uint64&lowbar;t RATELIMIT&lowbar;MAX&lowbar;BYTES = &lcub;1&lowbar;MiB&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
