[#BCLog-DEFAULT_MAX_LOG_BUFFER]
= xref:BCLog.adoc[BCLog]::DEFAULT&lowbar;MAX&lowbar;LOG&lowbar;BUFFER
:relfileprefix: ../
:mrdocs:

buffer up to 1MB of log data prior to StartLogging

== Synopsis

Declared in `&lt;logging&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
constexpr size&lowbar;t DEFAULT&lowbar;MAX&lowbar;LOG&lowbar;BUFFER = &lcub;1&apos;000&apos;000&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
