[#BCLog-DEFAULT_LOGRATELIMIT]
= xref:BCLog.adoc[BCLog]::DEFAULT&lowbar;LOGRATELIMIT
:relfileprefix: ../
:mrdocs:

Default for whether log rate limiting is enabled&period;

== Synopsis

Declared in `&lt;logging&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
constexpr bool DEFAULT&lowbar;LOGRATELIMIT = &lcub;true&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
