[#ArgsManager-CheckMultipleCLIArgs]
= xref:ArgsManager.adoc[ArgsManager]::CheckMultipleCLIArgs
:relfileprefix: ../
:mrdocs:

Check CLI command args

== Synopsis

Declared in `&lt;common&sol;args&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;requires&lowbar;capability(0x7f9524a23c48)&rsqb;&rsqb;
void
CheckMultipleCLIArgs() const;
----

== Exceptions

[cols="1,4"]
|===
| Name| Thrown on
| `std&colon;&colon;runtime&lowbar;error`
| when multiple CLI&lowbar;COMMAND arguments are specified
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
