[#ALWAYS_FALSE]
= ALWAYS&lowbar;FALSE
:mrdocs:

Always&hyphen;false variable template used to make static&lowbar;assert dependent on a type&period;

== Synopsis

Declared in `&lt;util&sol;types&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;class&gt;
inline constexpr bool ALWAYS&lowbar;FALSE = &lcub;false&rcub;;
----

== Description

Not needed after C&plus;&plus;23 (DR, https&colon;&sol;&sol;cplusplus&period;github&period;io&sol;CWG&sol;issues&sol;2518&period;html)&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
