[#bsl-vector_UintPtrRangeAdapter-end]
= xref:bsl.adoc[bsl]::xref:bsl/vector_UintPtrRangeAdapter.adoc[vector&lowbar;UintPtrRangeAdapter]::end
:relfileprefix: ../../
:mrdocs:

Return the sentinel at the end of this range&period;

== Synopsis

Declared in `&lt;bslstl&lowbar;vector&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
t&lowbar;SENTINEL
end() const;
----

== Return Value

sentinel at the end of this range


[.small]#Created with https://www.mrdocs.com[MrDocs]#
