[#bsl-operator_ms-06]
= xref:bsl.adoc[bsl]::operator&quot;&quot;&lowbar;ms
:relfileprefix: ../
:mrdocs:

`operator&quot;&quot;&lowbar;ms` overloads

== Synopses

Declared in `&lt;bslstl&lowbar;chrono&period;h&gt;`

Same as the preceding overload, for a `long double` argument&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
constexpr
bsl::chrono::duration&lt;long double, std::milli&gt;
xref:bsl/operator_ms-0e.adoc[operator&quot;&quot;&lowbar;ms](long double ms);
----

[.small]#xref:bsl/operator_ms-0e.adoc[_» more&period;&period;&period;_]#

Create a `bsl&colon;&colon;chrono&colon;&colon;duration` object having the `bsl&colon;&colon;milli` duration period and initialized with the specified `ms` number of milliseconds&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
constexpr
std::chrono::milliseconds
xref:bsl/operator_ms-0b.adoc[operator&quot;&quot;&lowbar;ms](unsigned long long ms);
----

[.small]#xref:bsl/operator_ms-0b.adoc[_» more&period;&period;&period;_]#

== Return Value

duration representing `ms` milliseconds

== Parameters

[cols="1,4"]
|===
| Name| Description
| *ms*
| number of milliseconds
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
