[#BloombergLP-bsltf-StdTestAllocatorConfiguration-setDelegateAllocatorRaw]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsltf.adoc[bsltf]::xref:BloombergLP/bsltf/StdTestAllocatorConfiguration.adoc[StdTestAllocatorConfiguration]::setDelegateAllocatorRaw
:relfileprefix: ../../../
:mrdocs:

Set the address of the delegate allocator to the specified `basicAllocator`&period;

== Synopsis

Declared in `&lt;bsltf&lowbar;stdtestallocator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
void
setDelegateAllocatorRaw(xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator);
----

== Parameters

[cols="1,4"]
|===
| Name| Description
| *basicAllocator*
| allocator to which `StdTestAllocator` delegates
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
