[#BloombergLP-bsltf-StdTestAllocator-0e]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsltf.adoc[bsltf]::xref:BloombergLP/bsltf/StdTestAllocator-05.adoc[StdTestAllocator]&lt;void&gt;
:relfileprefix: ../../
:mrdocs:

This specialization of `StdTestAllocator` for `void` type as the parameterized `TYPE` does not contain members that are unrepresentable for `void`&period;

== Synopsis

Declared in `&lt;bsltf&lowbar;stdtestallocator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;&gt;
class xref:BloombergLP/bsltf/StdTestAllocator-05.adoc[StdTestAllocator]&lt;void&gt;;
----

== Types

[cols="1,4"]
|===
| Name| Description
| xref:BloombergLP/bsltf/StdTestAllocator-0e/rebind.adoc[`rebind`] 
| Provide a namespace for a rebound `StdTestAllocator` type&period;
|===


== Type Aliases

[cols="1,4"]
|===
| Name| Description
| xref:BloombergLP/bsltf/StdTestAllocator-0e/const_pointer.adoc[`const&lowbar;pointer`] 
| Alias for a pointer to `const void`&period;
| xref:BloombergLP/bsltf/StdTestAllocator-0e/difference_type.adoc[`difference&lowbar;type`] 
| Alias for `bsls&colon;&colon;Types&colon;&colon;IntPtr`&period;
| xref:BloombergLP/bsltf/StdTestAllocator-0e/pointer.adoc[`pointer`] 
| Alias for a pointer to `void`&period;
| xref:BloombergLP/bsltf/StdTestAllocator-0e/size_type.adoc[`size&lowbar;type`] 
| Alias for `bsls&colon;&colon;Types&colon;&colon;UintPtr`&period;
| xref:BloombergLP/bsltf/StdTestAllocator-0e/value_type.adoc[`value&lowbar;type`] 
| Alias for the allocated `void` type&period;
|===


== Member Functions

[cols="1,4"]
|===
| Name| Description
| xref:BloombergLP/bsltf/StdTestAllocator-0e/2constructor-08.adoc[`StdTestAllocator`]         [.small]#[constructor]#
| Constructors
|===



[.small]#Created with https://www.mrdocs.com[MrDocs]#
